your logo here

RvdP

V1.1 Origin Product Overview

1 SiliconGraphics

Origin 2000 Origin 200

Origin 2000

your logo here

RvdP V1.1 Origin Product Overview

2 SiliconGraphics

The Origin Product Family

Enterprise Data & Technical Servers Supercomputers to 128 CPU’s

Web Proxy Serving ScientificGrand Challenges

Departmental & Workgroup Servers One product covers

complete range of solutions $15K $1M+

Engineering, Seismic Processing Data Warehousing

Origin200 Origin2000

your logo here

RvdP V1.1 Origin Product Overview

3 SiliconGraphics

Visualization Systems

Masters of Reality

5M polys/sec 1-4 200MHz CPU’s 64MB-2GB RAM 1-5 3.5" USCSI Disks Integrated Audio CDROM 4I/O slots 11M polys/sec

1-4 200MHz CPU’s 64MB-2GB RAM 1-5 3.5" USCSI Disks Integrated Audio CDROM 4I/O slots SuperWide Monitor (1920x1200) 11M polys/sec

2-24 200MHz CPU’s 2-6 Graphics Pipes 64MB-8GB RAM 1-11 3.5" USCSI Disks Integrated Audio CDROM 9 I/O slots SuperWide Monitor (1920x1200) Multi-pipe Rendering

80M polys/sec 5.4 Gigapixel/sec fill 16 200MHz CPU’s 8 Graphics pipes 512MB-8GB RAM SuperWide Monitor (1920x1200)

Onyx2 RealityOnyx2 InfiniteReality

(Deskside) Onyx2 InfiniteReality

(Rack) Onyx2 Reality Monster your logo here

RvdP V1.1 Origin Product Overview

4 SiliconGraphics

• 1-8 R10000 CPUs

• 3.2 GFLOPS

• 16GB Memory

• 5.1 [6.4] GB/s I/O

• 2.6 [3.2]GB/s Bisection Bandwidth

• 18.5TB Fibre Channel

• 3.5TB Ultra SCSI

• IRIX 6.4

• Upgrade to Rack • Departmental/Workgroup

Compute Servers

• Engineering Analysis

• Computational Chemistry

• Process Simulation

• Signal Processing

• Operations Research

Origin2000: Deskside

Keeping Pace with Growing Business

your logo here

RvdP

V1.1

Origin Product Overview

5

SiliconGraphics

• 2-128 R10000 CPUs

• 51.2 GFLOPS

• 256GB Memory

• 81.9 [102.4] GB/s I/O

• 74TB Fibre Channel

• 14TB Ultra SCSI

• 20.5 [26] GB/s Bisection Bandwidth

• IRIX 6.4

• Departmental Compute Servers

• Enterprise Compute Serving

• Large Engineering Analysis

• CFD, Crash Simulation

• Seismic/ Reservoir Simulation

• Image Processing

Origin2000: Rack

Keeping Pace with Growing Business

your logo here

RvdP

V1.1

Origin Product Overview

6

SiliconGraphics

Beyond 64 Processors

R

R

R R

R R

R R

R

R

R R

R R

R R

R

R

R R

R R

R R

R

R

R R

R R

R R

Cray

Router

• 64 to 128 CPUs

• Up to 256 GB memory

• Up to 192 XIO Slots

Cray

Router

your logo here

RvdP

V1.1

Origin Product Overview

7

SiliconGraphics

• 1-4 R10000 CPUs

• 1.6 GFLOPS

• 4 GB Memory

• 1-2 XIO Ports (2.6 [3.2] GB/s)

• 1.28 [1.6] GB/s Bisection Bandwidth

• 20TB Fibre Channel

• 4.4 TB Ultra SCSI

• 3-6 PCI64 Slots (267 MB/sec)

• 19" Rackmountable

• IRIX 6.4

• Departmental/Workgroup

Compute Servers

• Small Analysis Systems

• SW Development for Large Sites

• Rendering Servers

• Realtime Servers

Origin200

Bringing Innovation to New Price Points